Figure 1: The fit results of MDPWA (curves) and (PWA+MDF) (crosses) of ηπ� system: a) P_+ , b) D_+ intensities and c) their relative phase Δ(P_+ − D_+). Fig.1a shows also the contributions of 1�^+ signal intensity (1), the sum of the leakage and (signal - leakage) interference term (2) and the whole sum (3). The fitted leakage contribution is equal to ϵ^{(leak/D+)} = 0.018 at ϕ^{(leak)} = 80^o.